Period Left Endpoint Window Length 9 { Ratio 3 1.750000 0.04032749 0.7322 6 1.474695 0.01090425 0.7346 5 1.624397 0.00896171 0.1858 4 1.940551 0.00221122 0.1202 5 1.860587 0.00174412 0.0809 7 1.574716 0.00155813 0.0161 7 1.673954 0.00100256 0.0550 8 1.521706 0.00098832 0.1174 8 1.711036 0.00038896 {0.0098 6 1.907251 0.00026439 0.0112 7 1.832291 0.00022141 0.0129 5 1.985410 0.00013069 0.0254 8 1.809989 0.00011436 0.0192 7 1.884793 0.00009851 0.0075 8 1.851721 0.00008554 {0.0192 6 1.966764 0.00008007 0.0086 7 1.927141 0.00006387 {0.0011 8 1.869997 0.00006016 0.0255 7 1.953702 0.00003529 0.0069 8 1.896916 0.00002210 0.0005 8 1.917096 0.00001721 0.0014 7 1.977178 0.00001345 0.0018 6 1.996375 0.00000801 0.0060 8 1.960758 0.00000660 0.0007 7 1.991814 0.00000461 0.0016 8 1.972199 0.00000427 0.0006 8 1.981655 0.00000282 0.0003 8 1.988793 0.00000166 0.0006 8 1.994333 0.00000079 0.0004 7 1.999096 0.00000050 0.0015 8 1.997963 0.00000028 0.0004 8 1.999774 0.00000003 0.0004

Table 1: Numerical data for all primary windows of period at most 8, sorted by window length. The ratio which is compared with 9 in the last column is the length of the window divided by the distance from its left endpoint to the superstable parameter value in the window.